// Copyright 2020-2023 The Khronos Group Inc.
//
// SPDX-License-Identifier: CC-BY-4.0

// Common Valid Usage
// Common to VkBufferCopy* struct
  * [[VUID-{refpage}-size-01988]]
    The pname:size must: be greater than `0`
// Common Valid Usage
